         180           8
 -0.840003417408185       -1.05681267515589       -1.18862621684194     
  -1.35084259913962       -1.48646632961782       -1.59640843909948     
  -1.72258908713612       -1.89113816149390     
  -17.9605871042449       -17.8284480312949       -17.5010369783748     
  -17.1498292350408       -16.7423021701900       -16.3398174658310     
  -15.9498667303285       -15.5439314280265     
 -3.910006726969347E-006  0.000000000000000E+000
  0.992372591533467       0.000000000000000E+000
  0.995209370370851       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
