         180           8
 -0.617557621627383      -0.714445028981009      -0.908729769058375     
  -1.13826619596320       -1.34826898222796       -1.48715171115410     
  -1.66765415812939       -1.76092662563132     
  -17.8247256009880       -17.6196678007307       -17.3220444987693     
  -17.0048166895081       -16.6593869546871       -16.2738074482493     
  -15.8532738743028       -15.3779906807282     
 -3.815525348959011E-005  0.000000000000000E+000
  0.992531808039965       0.000000000000000E+000
  0.995327807837196       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
