         180           3
   4.50607047589359        6.09402137816844        8.09947410097863     
   20.2135077336318        20.9532270250955        21.7791926659145     
 -9.200272606012983E-004  0.000000000000000E+000
   1.00101670519023       0.000000000000000E+000
  0.997871114253730       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
