         180           8
 -0.577846554675269      -0.774782127665185      -0.909422579714804     
  -1.03959833921063       -1.21061577270690       -1.35807679988826     
  -1.46629911609379       -1.65495347314824     
  -17.9500648251443       -17.7458018132312       -17.4265750183234     
  -17.1093797419182       -16.7129222527340       -16.3196593018116     
  -15.8721894413495       -15.4719138192060     
 -6.929461316612113E-005  0.000000000000000E+000
  0.992553199715495       0.000000000000000E+000
  0.995371125901205       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
