         180           3
   5.71069948066144        7.35547149124901        9.27621476535127     
   19.1661304904393        19.9394319134858        20.7020745844807     
 -9.873166165064527E-004  0.000000000000000E+000
   1.00107276845482       0.000000000000000E+000
  0.997916004117135       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
