         180           8
   4.00597051466951        3.75665285721787        3.62222742419470     
   3.45371269067667        3.29966207976738        3.19885045503574     
   3.08685365154315        2.91172647796176     
  -18.9039801757912       -18.5053456745381       -18.2098938140271     
  -17.7919989264327       -17.3502035820673       -16.9378285132995     
  -16.5118812670600       -16.1051083011817     
  2.455725000563699E-003  0.000000000000000E+000
  0.992360935034855       0.000000000000000E+000
  0.995144682475152       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
