         180           8
   4.06179985114094        3.90361913261359        3.72059979669334     
   3.54174852698350        3.38410166913416        3.25226343496915     
   3.11997961183080        2.94302377889801     
  -18.5424687214541       -18.3460419281091       -18.0808877550217     
  -17.7229526665021       -17.3382750508313       -16.9477810809675     
  -16.5294883423156       -16.1416066760674     
  2.353912291248077E-003  0.000000000000000E+000
  0.992601205783941       0.000000000000000E+000
  0.995195111058228       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
