         180           8
  0.747364541282704       0.574990494468039       0.396530942875464     
  0.245238817969405       0.135757710793448      -1.699858785575264E-003
 -0.176413080531616      -0.185395180400022     
  -18.3008623980718       -18.0432973849703       -17.7449657280007     
  -17.3763803610959       -16.9636337386263       -16.5900127392570     
  -16.2009581781939       -15.7118220901326     
  2.064898342910129E-003  0.000000000000000E+000
  0.992210255834110       0.000000000000000E+000
  0.994984742566189       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
