         180           8
  0.765762013544178       0.624731067416283       0.444213045012742     
  0.295280249985961       0.117442543076563       2.207199408096712E-002
 -9.982066534679152E-002 -8.391606896374137E-002
  -18.4567673363240       -18.1990891059576       -17.8190642791180     
  -17.4255854495130       -17.0089942837608       -16.5625724800228     
  -16.0892300087738       -15.7841111127977     
  1.984106923566400E-003  0.000000000000000E+000
  0.992456997620965       0.000000000000000E+000
  0.995132908843465       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
