         180           3
   1.55773455006827        3.22707536141729        5.08906916732355     
   16.9039827541125        17.5035612619890        18.2736800233004     
 -1.218704071974727E-003  0.000000000000000E+000
   1.00075045011059       0.000000000000000E+000
  0.997741940361004       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
