         180           8
  0.711050483709635       0.522263068173338       0.363771033828695     
  0.239626615037327       5.425081808264716E-002 -0.110828588520937     
 -0.215968751285158      -0.399390874561489     
  -18.1068543711943       -17.9305260437087       -17.6159139691474     
  -17.2379921658978       -16.8575407162067       -16.4934057894974     
  -16.1000003202434       -15.6161575271740     
  1.896825071476639E-003  0.000000000000000E+000
  0.992659007040484       0.000000000000000E+000
  0.995379675494936       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
