         180           8
   3.14162871642419        2.47519155931156        1.80221772767412     
   1.15963878628817       0.555568426669018      -4.587565857469853E-002
 -0.622255571435897       -1.07099127531625     
  -13.7837840987812       -13.8345285546508       -14.2487834303053     
  -14.4870871314345       -14.6292019071623       -14.9170064600181     
  -15.0880514587527       -15.3000029411247     
  2.029760648301247E-003  0.000000000000000E+000
  0.992366932023304       0.000000000000000E+000
  0.995008672305501       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
