         180           8
   3.37551021520852        2.56256424038211        1.82464051594203     
   1.18999576188685       0.543100285089662      -4.940289650542039E-002
 -0.593307766744371       -1.12283982501341     
  -13.4834446274462       -13.9868054796732       -14.2440639645986     
  -14.4457708977118       -14.6261302679551       -14.7435710150463     
  -14.9243541848917       -15.1005922706177     
  1.870970967961127E-003  0.000000000000000E+000
  0.992570484517977       0.000000000000000E+000
  0.995135621806192       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
