         180           3
   1.56320495976783        3.20076431318401        5.09978462313185     
   15.4117409476605        16.0868438625600        16.8535530087866     
 -1.097094634548341E-003  0.000000000000000E+000
   1.00080429962500       0.000000000000000E+000
  0.997927783781955       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
