         180           8
   1.85198668657926        1.59460964663263        1.42006864830142     
   1.24931951656984        1.06824145656511       0.910948231737289     
  0.809266896739200       0.628424420909021     
  -19.7943921643692       -19.5838029569479       -19.2272589728982     
  -18.8250773328463       -18.4280276951338       -18.0146066418962     
  -17.5669994133156       -17.2386005269757     
  1.928681629185399E-003  0.000000000000000E+000
  0.992560638312362       0.000000000000000E+000
  0.995270965857568       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
