         180           8
   1.66088133617572        1.50972905216704        1.29687242717421     
   1.11849840020287       0.965116761791593       0.809271374053839     
  0.688945583573871       0.555583304334319     
  -19.7791690732320       -19.4717873400058       -19.1234276009681     
  -18.7414098073075       -18.3093172916114       -17.8771447152542     
  -17.4440011440752       -17.1314439249554     
  1.860360831410457E-003  0.000000000000000E+000
  0.992713646115099       0.000000000000000E+000
  0.995318167096257       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
