         180           3
   2.09486363831471        3.59967277424403        5.45025598518802     
   15.5887065430014        16.1973001565931        16.8915535926680     
 -1.208705448605403E-003  0.000000000000000E+000
   1.00102434701964       0.000000000000000E+000
  0.997703372642431       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
