         180           8
   1.47284434630415        1.29791671639865        1.11127767501899     
  0.965159639536927       0.788497969992629       0.625479107103576     
  0.522607638795584       0.391161644923800     
  -19.6056265179670       -19.4440551086082       -19.1345576362778     
  -18.7816521422396       -18.3864357102244       -17.9653002112169     
  -17.5446784448636       -17.1061662256176     
  1.775945345719644E-003  0.000000000000000E+000
  0.992959974665581       0.000000000000000E+000
  0.995507121279708       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
