         180           8
   1.48073122207157        1.30088323850033        1.10184456305125     
  0.975554566716272       0.845583876211069       0.697987528805619     
  0.604220713364184       0.398556992792312     
  -19.6616254775758       -19.4618525680834       -19.1644472102488     
  -18.7905071694809       -18.3666726253505       -17.9512186292943     
  -17.5195577538575       -17.1617500297553     
  1.817458811937908E-003  0.000000000000000E+000
  0.992954961568470       0.000000000000000E+000
  0.995367165920684       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
