         180           8
   2.93923074278737        2.28672033621336        1.71155163507927     
   1.11741057883909       0.529834238382507      -2.421522550552365E-002
 -0.602977051581498       -1.10265488171812     
  -13.8118900329833       -13.8767123220591       -14.0226043991002     
  -14.3205803634650       -14.6419049136982       -14.9122970238707     
  -15.1006407393036       -15.2917794566514     
  1.709713489304382E-003  0.000000000000000E+000
  0.992374379481474       0.000000000000000E+000
  0.994966019235278       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
