         180           8
   2.78510839775558        2.18200931351586        1.55211321963698     
  0.960169521732588       0.364593104501618      -0.231695759184839     
 -0.789144169492768       -1.27106471768106     
  -13.8072435135218       -13.8265155451979       -13.9173432748677     
  -14.0488944088829       -14.2551370272718       -14.5216673060299     
  -14.8171584024207       -15.1117756224977     
  1.687286692676020E-003  0.000000000000000E+000
  0.992294388954073       0.000000000000000E+000
  0.994925246082939       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
