         180           8
   2.79807210824711        2.10704543240952        1.50528956406971     
  0.859354104960572       0.286771482556161      -0.288235857749192     
 -0.860060607444283       -1.40837761548425     
  -13.7742628365300       -13.8444349904369       -13.9358053887940     
  -14.0903681062053       -14.3113966011392       -14.5659919430166     
  -14.8482470613741       -15.0740561011516     
  1.724808163866010E-003  0.000000000000000E+000
  0.992195364804460       0.000000000000000E+000
  0.994969036071803       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
