         180           8
   2.90972214484111        2.20949152464304        1.55158103452601     
  0.906172572397531       0.284370174816045      -0.310228241738520     
 -0.875348087319377       -1.37861940366059     
  -13.7127474588080       -13.8750618683446       -13.9957532899622     
  -14.1780354016706       -14.4047886242086       -14.6739026149079     
  -14.9585904408266       -15.2036384908708     
  1.656236223374781E-003  0.000000000000000E+000
  0.992373994765082       0.000000000000000E+000
  0.994991742763612       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
