         180           8
   1.98652610918222        1.30002714454014       0.643672345407248     
  2.683133154331626E-002 -0.543928274289551       -1.18533340496692     
  -1.80099231178741       -2.32573769735315     
  -12.4544948640266       -12.5578723520305       -12.6586500855231     
  -12.8378738098379       -13.0075062553876       -13.2417328054558     
  -13.5313517525858       -13.8655863061789     
  2.347448632753632E-003  0.000000000000000E+000
  0.991087482282035       0.000000000000000E+000
  0.993794851910628       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
