         180           3
   12.0656948283076        9.76061080642787        7.47094314472806     
   20.1854524195566        20.6022835324153        20.8430070665222     
 -1.049013097504922E-003  0.000000000000000E+000
   1.00066216300107       0.000000000000000E+000
  0.997581529571291       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
