         180           8
   1.98538629998384        1.31960938924001       0.701708642844733     
  8.250842414247010E-002 -0.523560291341434       -1.18107425846730     
  -1.77381743620588       -2.18443552429231     
  -12.5798986296420       -12.5091840404094       -12.6204927951447     
  -12.7858839622754       -12.9799046267638       -13.1794332503083     
  -13.5186788534146       -13.8464864528518     
  2.362814033229523E-003  0.000000000000000E+000
  0.991016371438035       0.000000000000000E+000
  0.993667505902222       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
