         180           8
   2.00401289083506        1.18897022890988       0.606411452105656     
 -4.492821889476985E-003 -0.600233761173133       -1.18767385006238     
  -1.76423887005383       -2.27160491624342     
  -12.3860425149939       -12.4491061873566       -12.5432249096805     
  -12.6958341187547       -12.8596563068009       -13.1198657219751     
  -13.4601724738410       -13.8810990685646     
  2.361294042546311E-003  0.000000000000000E+000
  0.990896470477472       0.000000000000000E+000
  0.993622238282650       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
