         180           8
  -1.25987003264370       -1.43197169219732       -1.55545490512437     
  -1.70120504036161       -1.76118575032220       -1.91436376761363     
  -2.07208387227803       -2.26391604962892     
  -16.3914141867680       -16.0860574657749       -15.7719170639283     
  -15.4439887637047       -15.0275990532549       -14.5692151571037     
  -14.1624117543884       -13.7533145486459     
  2.425770909777531E-003  0.000000000000000E+000
  0.990585668637561       0.000000000000000E+000
  0.993390119969876       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
