         180           8
 -0.166117502338407      -0.388956656448542      -0.535697194155493     
 -0.729133079635266      -0.960961673419960       -1.16971617039082     
  -1.39616877543958       -1.40361510228102     
  -19.2146297182288       -19.1293536361484       -18.8261503445804     
  -18.4607175730367       -18.0218418373407       -17.5694973064373     
  -17.1050914789408       -16.5859908259387     
  1.608573741755107E-003  0.000000000000000E+000
  0.991718360278476       0.000000000000000E+000
  0.994382531638214       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
