         180           8
  0.376111488204141       0.100701938200648      -2.114386725840304E-002
 -0.211729725368719      -0.381922536183589      -0.555973469982239     
 -0.668919461122791      -0.772812700265245     
  -20.2279944365437       -19.9221260105995       -19.5005193352286     
  -19.0586854235199       -18.6281226977191       -18.2066714750152     
  -17.8032530643608       -17.4734017364254     
  1.762052289520838E-003  0.000000000000000E+000
  0.991449632815484       0.000000000000000E+000
  0.994320210797380       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
