         180           3
   2.57075547213102        4.29740001000994        6.34299260333348     
   16.6627155020725        17.5024113047213        18.2044736519490     
 -1.063789564649896E-003  0.000000000000000E+000
   1.00055170793476       0.000000000000000E+000
  0.997464035611550       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
