         180           3
   3.04066717919235        4.68001517598062        6.66375044025402     
   16.8239887085205        17.4804821487381        18.2049406421483     
 -1.117586626902439E-003  0.000000000000000E+000
   1.00051416685998       0.000000000000000E+000
  0.997365425456891       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
