         180           3
   2.43221894078351       0.622748307246638      -0.445347984590278     
   15.5918181738908        15.8671860012930        16.0335106123048     
 -1.073721060623218E-003  0.000000000000000E+000
   1.00054851610740       0.000000000000000E+000
  0.997373704219052       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
