         180           8
 -7.936589119246522E-002 -0.427535369156882      -0.734495698757327     
  -1.00894304629437       -1.23554008132352       -1.46131507889005     
  -1.63347302380664       -1.74788105641665     
  -21.2573491856950       -21.5239428095282       -21.7855232969641     
  -21.9991192635535       -22.2691436903570       -22.4672797866345     
  -22.6840181521038       -22.9348054930709     
  1.446108159548371E-003  0.000000000000000E+000
  0.991900830163016       0.000000000000000E+000
  0.994695264250603       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
