         180           8
 -0.246965224758804      -0.575287640521860      -0.920552595088054     
  -1.23409470278256       -1.50270373584790       -1.68691155208502     
  -1.80612333031189       -1.95426716577061     
  -21.1734522113348       -21.6696380439994       -21.9846862551948     
  -22.3152307478073       -22.5993758044630       -22.8553688825832     
  -23.1354355710535       -23.5769117051191     
  1.324474221883495E-003  0.000000000000000E+000
  0.991941286911137       0.000000000000000E+000
  0.994814439263555       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
