         180           8
 -3.181270643227804E-002 -0.396314684080977      -0.712430668933586     
  -1.06049288800889       -1.35135395541573       -1.55097090766930     
  -1.73849395722600       -1.82728481638389     
  -21.1219515472544       -21.6372779896078       -22.2371000627006     
  -22.7888281758263       -23.1564215028417       -23.4436330686415     
  -23.7049356049664       -23.9954713062320     
  1.247615833881263E-003  0.000000000000000E+000
  0.992171752065020       0.000000000000000E+000
  0.995027047023831       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
