         180           8
  0.477911066866063       3.121103808396386E-002 -0.357516326803288     
 -0.621504377448004      -0.865349868169352       -1.11489228542412     
  -1.33634560682100       -1.29796013982753     
  -21.0785150018188       -21.3966000209156       -21.7434607418711     
  -22.0744632842054       -22.3579343955510       -22.6035611461403     
  -22.8682468273594       -23.0246374898331     
  1.558363928686852E-003  0.000000000000000E+000
  0.991778285537773       0.000000000000000E+000
  0.994604366786897       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
