         180           8
   3.49015838569174        2.79001294664251        2.09828432420996     
   1.44872187798666       0.836927035292850       0.252010802143442     
 -0.272687067049316      -0.727075437591817     
  -17.1489024905041       -17.2987194569483       -17.4594765207721     
  -17.6334314357466       -17.8721467813060       -18.1274857451377     
  -18.2873926906901       -18.5525598595228     
  1.358806180558473E-003  0.000000000000000E+000
  0.992138101728164       0.000000000000000E+000
  0.994904046919611       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
