         180           8
   1.03760488734038       0.837276420345191       0.600523134897545     
  0.447285904174696       0.276331169451401       0.130035976389459     
  2.946661601286258E-002 -0.172585494149746     
  -21.7654703727760       -21.4553599124714       -21.1411719960313     
  -20.7694944602479       -20.3765060413657       -19.9502132915946     
  -19.5228945418839       -19.0448979842125     
  1.482844335882138E-003  0.000000000000000E+000
  0.991639933328320       0.000000000000000E+000
  0.994637459184483       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
