         180           8
   3.12484705168949        2.48128044364375        1.88110080737422     
   1.25980322087964       0.624081722343427       4.068703013854241E-003
 -0.540803603447912       -1.00276134810616     
  -16.9894305199531       -17.1638667561151       -17.2484801814519     
  -17.3976295180736       -17.6717925897565       -17.9522283079283     
  -18.1620228832810       -18.5308626678383     
  1.409379472298760E-003  0.000000000000000E+000
  0.991826457949851       0.000000000000000E+000
  0.994738641746894       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
