         180           8
   2.97118576783182        2.27090618897594        1.56544018006480     
  0.929061619924870       0.372324951367248      -0.208365061903148     
 -0.770151881785241       -1.28272027988730     
  -17.0059704641260       -17.1414776587932       -17.3136271113559     
  -17.5340908762062       -17.7860776756596       -18.1173835199903     
  -18.3666518942958       -18.6356113902862     
  1.329772619653898E-003  0.000000000000000E+000
  0.991998019273202       0.000000000000000E+000
  0.994785183525739       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
