         180           8
   2.91697661862587        2.15938970439084        1.48829959455809     
  0.857817903126874       0.241192123689183      -0.305194363400155     
 -0.813395089327416       -1.25074698750256     
  -16.9762508739144       -17.2727211214782       -17.4067683592308     
  -17.6189759787250       -17.8422660309810       -18.0579495434597     
  -18.3134347213604       -18.5414245685579     
  1.234635538460400E-003  0.000000000000000E+000
  0.992276718021660       0.000000000000000E+000
  0.994948760491289       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
