         180           8
  -2.61320915497153       -3.02579751873982       -3.39927550277948     
  -3.76402794182303       -4.12660007536232       -4.46941862975535     
  -4.72100598225353       -5.05487120158304     
  -17.2120730412906       -16.3700839093859       -16.3515460872480     
  -16.4739380190494       -16.6431679444474       -16.8805156790635     
  -17.0833307407335       -17.2295259026913     
  9.788981297470124E-004  0.000000000000000E+000
  0.992518831829549       0.000000000000000E+000
  0.995158341897432       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
