         180           8
   3.33466935573708        2.65928705103598        2.00662333489024     
   1.34271116419457       0.745057717633457       0.181843926197827     
 -0.371377869969863      -0.811098170948848     
  -8.27741217294587       -8.37458785514900       -8.53286775089519     
  -8.69362171943389       -8.89540157062272       -9.17667529659597     
  -9.39696619469899       -9.56290142309591     
  3.037677008687500E-004  0.000000000000000E+000
  0.992219326608494       0.000000000000000E+000
  0.994986049100378       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
