         180           3
   12.6158518274041        10.5635020303142        8.46410392053652     
   19.4398516102382        19.6968281406618        20.4505289337640     
 -1.693418427955870E-003  0.000000000000000E+000
   1.00167176900474       0.000000000000000E+000
  0.998788755063666       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
