         180           8
   3.53810169825020        2.88106111356867        2.26701921088943     
   1.59001383120725       0.955612554310564       0.387348410793582     
 -0.130229302106872      -0.717211046504211     
  -8.22851003390358       -8.27435627712745       -8.49958996631820     
  -8.70997522298446       -8.87830786823103       -9.13887129989077     
  -9.46079202933016       -9.57973155859845     
  2.666648252032634E-004  0.000000000000000E+000
  0.992328701575104       0.000000000000000E+000
  0.995133540790724       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
