         180           8
   3.49115406785408        2.84345795520019        2.21136883673497     
   1.58229777910973       0.977910823043341       0.405385213050506     
 -0.158065273042352      -0.643728115053713     
  -8.10238143892379       -8.23645999436028       -8.41572834233615     
  -8.59223848368360       -8.81104707267601       -9.07113294191136     
  -9.32107811878233       -9.52012298308700     
  1.929319945332330E-004  0.000000000000000E+000
  0.992457732812732       0.000000000000000E+000
  0.995229393948380       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
