         180           3
   5.24032027531785        6.88107079300471        8.70886842407912     
   19.4579443966889        20.3322049655740        20.9904987094317     
 -1.657947644218446E-003  0.000000000000000E+000
   1.00142291125159       0.000000000000000E+000
  0.998410480489845       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
