         180           8
  0.949067889118569       0.819914731183544       0.633198646911394     
  0.489918608200969       0.363715217850214       0.208806219982152     
  4.682115674301695E-002 -5.270269199621020E-003
  -12.0542589209369       -11.7147668876719       -11.4066565272069     
  -11.0213340793754       -10.5810263655118       -10.1659102269298     
  -9.77112137670237       -9.39911133912281     
  4.378352455297104E-004  0.000000000000000E+000
  0.991914168509599       0.000000000000000E+000
  0.994745853622726       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
