         180           3
   5.41764458094821        7.01407373329018        8.93830164017144     
   19.6982807654284        20.3734801909701        21.0344498819843     
 -1.705003487840058E-003  0.000000000000000E+000
   1.00147178273438       0.000000000000000E+000
  0.998366634741847       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
